0 200 400 600 800 1000

1200

1400

0 100 200 300 0 200 400 600 800 1000

1200

1400

0 0.1 0.2 0.3 0.4 0.5

0 200 400 600 800 1000

1200

1400

1600

-200 0 200

ID Entries Mean RMS

100 300 57.96 39.15

n events

ID Entries Mean RMS

10011 24063 0.1485 0.4240E-01

1/sqrt(n) events

ID Entries Mean RMS

201 23944 0.1559 61.93 1798. / 97 Constant 1101. Mean 0.5438 Sigma 47.85

Σ Γ (n)

ID Entries Mean RMS

202 23944 0.8820E-03 0.1545 334.7 / 74 Constant 1273. Mean 0.9591E-03 Sigma 0.1480

Σ Γ ( 1/sqrt(n) ) 0 200 400 600 800 1000

1200

1400

1600

-1 -0.5 0 0.5 1