t0

P10 runs 204-211^{2004/07/20 15.23}

deltat small

t0 t0

0 10 20 30 40 50 60 70 80

200 300 400 500 600 700 800

0 10 20 30 40 50 60 70

200 250 300 0 10 20 30 40 50

750 800