DX row 3

P10 runs 204-207

-0.2

-0.1 0 0.1 0.2

-6 -4 -2 0 2 4 6

2004/07/20 17.11

DX row 4

0

0.1

-6 -4 -2 0 2 4 6

DX row 5

-0.1

-0.05 0 0.05 0.1

-6 -4 -2 0 2 4 6

DX row 2

P10 runs 204-207

0

0.05

0.1

-6 -4 -2 0 2 4 6

2004/07/20 17.11

DX row 6

-0.1

-0.05 0 0.05

-6 -4 -2 0 2 4 6

no cuts on θ or z