0 0.2 0.4 0.6 0.8 1 1.2

0 1000 2000 3000 0 0.25 0.5 0.75 1 1.25 1.5 1.75 2 2.25 2.5

400 600 800 1000

0 0.2 0.4 0.6 0.8 1 1.2 1.4

0 5 10 15 time bin

Γ (mm)

ArCO_2

time bin

Γ (mm)

P10

28.27 / 28 A0 0.2855 A1 0.4516E-01

drift distance (cm)

Γ^2 (mm^2)

29.73 / 28 A0 0.3291 A1 0.1614

drift distance (cm)

Γ^2 (mm^2)

0 0.5 1 1.5 2 2.5 3 3.5 4

0 5 10 15