-30

-20

-10

0

10

20

30

-30 -20 -10 0 10 20 30 40

Run 1010, Event 22

Track: X0= -1.79748, Phi=0.186597, Sigma=0.690961

x ΜmmΝ y ΜmmΝ

2 5 8.5 14 20 25 30 35 40 50 60 70 80 90 100 120 140