114.9 / 118 P1 15.85 P2 1.020 P3 2.469 P4 25.42

Micrometer Position

Scaled Amplitude

Micromegas Pad Response for Pad 16,18 December 2003 Data Set

0

0.2

0.4

0.6

0.8

1

10 12 14 16 18 20