0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

0 0.2 0.4 0.6 0.8 1 1.2

0.003+0.05*x

GEM 16/1/2004 ID Entries Mean RMS

100 100 0.7818 0.2949

scaled amplitude mean sigma

(0.003+0.05*x)/20

ID Entries Mean RMS

101 100 0.7818 0.2949

scaled amplitude mean error on mean

0 0.05 0.1 0.15 0.2 0.25 0.3 0.35 0.4 x 10^{-2}

0 0.2 0.4 0.6 0.8 1 1.2