dx4 phi_1 0 50 100 150 200

-2 -1 0 1 2

154.8 / 74 Constant 153.9 Mean 0.2062E-01 Sigma 0.2067

dx4 phi_1 0

50

100

150

200

-2 -1 0 1 2

113.8 / 74 Constant 143.1 Mean 0.1568E-01 Sigma 0.2484

dx4 phi_1 0

50

100

150

-2 -1 0 1 2

107.6 / 76 Constant 113.8 Mean 0.2128E-01 Sigma 0.3629

dx4 phi_1 0

20

40

-2 -1 0 1 2

85.05 / 86 Constant 37.56 Mean 0.4641E-02 Sigma 0.5156

dx5 phi_1 0

50

100

150

-2 -1 0 1 2

145.2 / 72 Constant 124.1 Mean 0.1265E-01 Sigma 0.2529

dx5 phi_1 0

50

100

150

-2 -1 0 1 2

112.0 / 73 Constant 120.2 Mean 0.1171E-01 Sigma 0.2929

dx5 phi_1 0

50

100

150

-2 -1 0 1 2

98.88 / 74 Constant 113.4 Mean 0.1465E-01 Sigma 0.3657

dx5 phi_1 0

20

40

-2 -1 0 1 2

77.14 / 85 Constant 40.68 Mean 0.2341E-01 Sigma 0.4773

dx4 t0_1 0 50 100 150 200

-2 -1 0 1 2

154.8 / 74 Constant 153.9 Mean 0.2062E-01 Sigma 0.2067

dx4 t0_2 0 20 40 60 80 100

-2 -1 0 1 2

83.42 / 63 Constant 71.64 Mean 0.2289E-01 Sigma 0.2722

dx4 t0_3 0 25 50 75 100

-2 -1 0 1 2

104.7 / 69 Constant 78.33 Mean 0.2144E-01 Sigma 0.3396

dx4 t0_4 0

50

100

-2 -1 0 1 2

103.3 / 78 Constant 71.87 Mean 0.3543E-01 Sigma 0.3966

dx5 t0_1 0

50

100

150

-2 -1 0 1 2

145.2 / 72 Constant 124.1 Mean 0.1265E-01 Sigma 0.2529

dx5 t0_2 0

20

40

60

-2 -1 0 1 2

66.38 / 66 Constant 61.77 Mean 0.1995E-01 Sigma 0.3216

dx5 t0_3 0

25

50

75

100

-2 -1 0 1 2

109.8 / 76 Constant 72.27 Mean 0.5666E-02 Sigma 0.3700

dx5 t0_4 0 20 40 60 80

-2 -1 0 1 2

107.1 / 85 Constant 66.05 Mean 0.1612E-01 Sigma 0.4327