dx4 phi_1 0

100

200

300

400

-2 -1 0 1 2

155.8 / 70 Constant 338.7 Mean 0.2499E-01 Sigma 0.1546

dx4 phi_1 0

100

200

300

-2 -1 0 1 2

149.9 / 70 Constant 295.7 Mean 0.2536E-01 Sigma 0.2102

dx4 phi_1 0

100

200

-2 -1 0 1 2

91.65 / 77 Constant 229.5 Mean 0.1529E-01 Sigma 0.3101

dx4 phi_1 0

20

40 60

80

-2 -1 0 1 2

93.25 / 82 Constant 67.86 Mean -0.3469E-02 Sigma 0.4516

dx5 phi_1 0

100

200

300

-2 -1 0 1 2

279.0 / 76 Constant 216.8 Mean 0.2303E-01 Sigma 0.2198

dx5 phi_1 0

100

200

-2 -1 0 1 2

142.2 / 75 Constant 223.0 Mean 0.2831E-01 Sigma 0.2672

dx5 phi_1 0

100

200

-2 -1 0 1 2

93.19 / 76 Constant 220.5 Mean 0.2134E-01 Sigma 0.3185

dx5 phi_1 0 20 40 60 80

-2 -1 0 1 2

75.69 / 79 Constant 67.07 Mean 0.2732E-01 Sigma 0.4601

dx4 t0_1 0

100

200

-2 -1 0 1 2

104.0 / 57 Constant 206.6 Mean 0.2792E-01 Sigma 0.1429

dx4 t0_2 0

50

100

150

-2 -1 0 1 2

76.83 / 53 Constant 135.5 Mean 0.2286E-01 Sigma 0.1656

dx4 t0_3 0

50

100

150

-2 -1 0 1 2

61.82 / 52 Constant 132.3 Mean 0.2977E-01 Sigma 0.1933

dx4 t0_4 0

50

100

150

-2 -1 0 1 2

80.52 / 61 Constant 126.3 Mean 0.3991E-01 Sigma 0.2255

dx5 t0_1 0

50

100

150

-2 -1 0 1 2

207.1 / 70 Constant 118.5 Mean 0.2431E-01 Sigma 0.2176

dx5 t0_2 0

50

100

-2 -1 0 1 2

96.55 / 57 Constant 98.93 Mean 0.2226E-01 Sigma 0.2170

dx5 t0_3 0

50

100

-2 -1 0 1 2

97.46 / 58 Constant 104.1 Mean 0.3343E-01 Sigma 0.2354

dx5 t0_4 0

50

100

-2 -1 0 1 2

88.25 / 60 Constant 99.99 Mean 0.2257E-01 Sigma 0.2807