0.5 1 1.5 2 2.5

2000 2500 3000 3500 4000 4500 5000 5500 6000 time σ ΜmmΝ

161.5 / 63 A0 -2.185 A1 0.1028E-02

time σ^2 ΜmmΝ

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5

2000 2500 3000 3500 4000 4500 5000 5500 6000