0.2

0.4

0.6

0.8

1

1.2

1.4

0 500 1000 1500 2000 2500 3000 3500 4000 time σ ΜmmΝ

94.37 / 71 A0 0.2198 A1 0.1849E-03

time σ^2 ΜmmΝ

0

0.2

0.4

0.6

0.8

1

0 500 1000 1500 2000 2500 3000 3500 4000