x0 phi

time bin σ ΜmmΝ

dx5

ID Entries Mean RMS

102 3764 0.1021E-01

0.4309

dx6

ID Entries Mean RMS

103 3764 0.1884E-01 0.4616

0 20 40 60 80

-20 0 20 0 25 50 75

-0.5 0 0.5

0

0.5

1

1.5

0 500 1000 1500 2000 2500 3000 3500 4000

0

100

200

300

-2 0 2 0

100

200

-2 0 2